Top20 Supercomputers - Europe

N Manufacturer Installation Site Field of # Rmax N_{max}

Europe Computer Location/Year Application Proc. Rpeak N1/2 world [Mflop/s] 1 Cray University of Edinburgh Academic 256 25300 40960 14 T3D MC256-8 Edinburgh UK /1994 38000 4918 2 Cray ECMWF Research 16 13700 10000 31 Y-MP C916/16256 Reading UK /1994 Weather 15238 650 3 Cray Government Communications Headquarters Classified 16 13700 10000 37 Y-MP C916/16256 Benhall UK /1994 15238 650 4 Cray United Kingdom Meteorological Office Research 16 13700 10000 44 Y-MP C916/16256 Bracknell UK /1994 Weather 15238 650 5 Cray CEA/Centre d’Etudes Research 128 12800 20736 46 T3D MC128-2 Limeil-Valenton France /1993 19000 3408 6 Cray Commissariat a l’Energie Atomique Research 128 12800 20736 48 T3D MC128-2 Grenoble France /1994 Energy 19000 3408 7 Cray ECMWF Research 128 12800 20736 49 T3D MC128-2 Reading UK /1994 Weather 19000 3408 8 Cray Ecole Polytechnique Federale de Lausanne Academic 128 12800 20736 50 T3D MC128-2 Lausanne Switzerland /1994 19000 3408 9 IBM CERN Research 64 12100 27000 58 SP2/64 Geneva Switzerland /1994 17000 6200 10 NEC German Aerospace Laboratory (DLR) Research 2 11600 4352 61 SX-3/24R Goettingen Germany /1994 Aerospace 13000 516 11 NEC Swiss Scientific Computing Center Research 2 11600 4352 64 SX-3/24R Manno Switzerland /1994 13000 516 12 Cray DKRZ Research 12 10270 . 65 Y-MP C916/12256 Hamburg Germany /1994 Weather 11430 . 13 IBM PIK Research 48 9100 . 73 SP2/48 Potsdam Germany /1994 12770 . 14 TMC Institut de Physique du Globe de Paris (IPG) Research 128 7700 18432 78 CM-5/128 Paris France /1992 16000 8192 15 Cray CNRS Research 8 6850 . 88 Y-MP C98/8512 Orsay France /1993 7619 . 16 KSR Leibniz Rechenzentrum Academic 110 6380 . 98 KSR2-110 Muenchen Germany /1994 8800 . 17 SNI Universitaet Aachen Academic 4 5600 7344 106 VPP500/4 Aachen Germany /1993 6400 1250 18 SNI Universitaet Darmstadt Academic 4 5600 7344 107 VPP500/4 Darmstadt Germany /1994 6400 1250 19 NEC National Aerospace Laboratory (NLR) Research 2 5000 3072 116 SX-3/22 Noordoostpolder Netherlands /1992 Aerospace 5500 384 20 Cray Electricite de France Industry 6 4630 . 121 Y-MP C98/6256 Clamart France /1994 Energy 5715 .

Top20 Supercomputers - UK

N Manufacturer Installation Site Field of # Rmax N_{max}

UK Computer Location/Year Application Proc. Rpeak N1/2 world [Mflop/s] 1 Cray University of Edinburgh Academic 256 25300 40960 14 T3D MC256-8 Edinburgh UK /1994 38000 4918 2 Cray ECMWF Research 16 13700 10000 31 Y-MP C916/16256 Reading UK /1994 Weather 15238 650 3 Cray Government Communications Headquarters Classified 16 13700 10000 37 Y-MP C916/16256 Benhall UK /1994 15238 650 4 Cray United Kingdom Meteorological Office Research 16 13700 10000 44 Y-MP C916/16256 Bracknell UK /1994 Weather 15238 650 5 Cray ECMWF Research 128 12800 20736 49 T3D MC128-2 Reading UK /1994 Weather 19000 3408 6 Meiko CERFACS Research 32 2800 13824 192 CS-2/32 Toulouse UK /1994 5800 3488 7 Intel Grant Tensor Industry 128 2600 12000 200 iPSC/860 London UK /1991 Geophysics 5120 4500 8 Intel Grant Tensor Industry 128 2600 12000 201 iPSC/860 London UK /1994 Geophysics 5120 4500 9 TMC University of Edinburgh Academic 512 2400 14848 219 CM-200/16k Edinburgh UK / . 5000 5632 10 Cray Atomic Weapons Establishment Classified 8 2144 . 226 Y-MP8/864 Aldermaston UK / . 2667 . 11 Cray Rutherford Appleton Laboratory Research 8 2144 . 250 Y-MP8I/8128 UK /1992 2667 . 12 Fujitsu University of Manchester Academic 1 2110 . 259 VPX240/10 Manchester UK /1993 2500 . 13 KSR Government Communications Headquarters Classified 64 1838 9216 316 KSR1-64 UK /1992 2560 1536 14 KSR University of Manchester Academic 64 1838 9216 319 KSR1-64 Manchester UK /1994 2560 1536 15 Intel Intel SSD Development Centers Vendor 56 1750 6000 332 XP/A4 Swindon UK /1994 2800 . 16 MasPar University College Dublin Academic 16384 1600 11264 371 MP-2216 Dublin Ireland /1994 2400 1920 17 IBM Western Geophysical Industry 8 1600 9500 377 SP2/8 UK /1994 Geophysics 2120 . 18 SGI Pfizer Industry 6 1467 14000 394 Power Challenge Sandwich UK /1994 Chemistry 1800 1000 19 SGI Silicon Graphics Vendor 6 1467 14000 397 Power Challenge Theale UK /1994 1800 1000 20 SGI Silicon Graphics Vendor 6 1467 14000 398 Power Challenge Theale UK /1994 1800 1000

Top20 Supercomputers - France

N Manufacturer Installation Site Field of # Rmax N_{max}

France Computer Location/Year Application Proc. Rpeak N1/2 world [Mflop/s] 1 Cray CEA/Centre d’Etudes Research 128 12800 20736 46 T3D MC128-2 Limeil-Valenton France /1993 19000 3408 2 Cray Commissariat a l’Energie Atomique Research 128 12800 20736 48 T3D MC128-2 Grenoble France /1994 Energy 19000 3408 3 TMC Institut de Physique du Globe de Paris (IPG) Research 128 7700 18432 78 CM-5/128 Paris France /1992 16000 8192 4 Cray CNRS Research 8 6850 . 88 Y-MP C98/8512 Orsay France /1993 7619 . 5 Cray Electricite de France Industry 6 4630 .

121 Y-MP C98/6256 Clamart France /1994 Energy 5715 .

6 Cray Direction de la Meteorologie Nationale Research 4 3275 . 175 Y-MP C98/4256 Toulouse France /1993 Weather 3810 .

7 Intel ONERA Research 128 2600 12000 206 iPSC/860 Chatillon France /1991 Aerospace 5120 4500 8 Cray Commissariat a l’Energie Atomique Research 3 2489 .

211 Y-MP C94/3256 Grenoble France /1994 Energy 2857 .

9 TMC INRIA - Sophia Antipolis Research 512 2400 14848 217 CM-200/16k Rennes France /1992 5000 5632 10 Cray Commissariat a l’Energie Atomique Research 8 2144 . 228 Y-MP8/8128 Limeil France /1991 Energy 2667 . 11 SNI IFP (Institute Francais du Petrole) Academic 1 2110 . 258 S400/10 Rueil-Malmaison France /1992 Geophysics 2500 . 12 KSR INRIA - Sophia Antipolis Research 72 2030 . 260 KSR1-72 Rennes France /1994 2880 . 13 Intel ONERA Research 66 2000 8000 268 XP/S5 Chatillon France /1994 Aerospace 3300 . 14 TMC Compagnie Generale de Geophysique (CGG) Industry 32 1900 9216 292 CM-5/32 Massy France /1993 Geophysics 4096 4096 15 TMC Site Experimental Hyperparallelisme (SEH/ETCA) Research 32 1900 9216 302 CM-5/32 Arcueil France / . 4096 4096 16 Convex ENS Research 16 1746 . 344 SPP1000/XA-16 Lyon France /1994 3200 . 17 Intel IRISA Research 48 1500 . 379 XP/A4E Rennes France /1993 Aerospace 2400 . 18 SGI Silicon Graphics Vendor 6 1467 14000 396 Power Challenge Paris France /1994 1800 1000 19 Cray Direction de la Meteorologie Nationale Research 4 1406 . 416 CRAY-2/4-256 Toulouse France /1989 Weather 1951 . 20 Cray Citroen Peugeot Industry 4 1159 . 467 Y-MP4E/464 Velizy France /1992 Automotive 1333 .

Top20 Supercomputers - Germany

N Manufacturer Installation Site Field of # Rmax N_{max}

Germany Computer Location/Year Application Proc. Rpeak N1/2 world [Mflop/s] 1 NEC German Aerospace Laboratory (DLR) Research 2 11600 4352 61 SX-3/24R Goettingen Germany /1994 Aerospace 13000 516 2 Cray DKRZ Research 12 10270 . 65 Y-MP C916/12256 Hamburg Germany /1994 Weather 11430 . 3 IBM PIK Research 48 9100 . 73 SP2/48 Potsdam Germany /1994 12770 . 4 KSR Leibniz Rechenzentrum Academic 110 6380 . 98 KSR2-110 Muenchen Germany /1994 8800 . 5 SNI Universitaet Aachen Academic 4 5600 7344 106 VPP500/4 Aachen Germany /1993 6400 1250 6 SNI Universitaet Darmstadt Academic 4 5600 7344 107 VPP500/4 Darmstadt Germany /1994 6400 1250 7 Intel KFA Research 140 4100 .

127 XP/S10 Juelich Germany /1994 7000 .

8 SNI Universitaet Aachen Academic 1 4009 . 140 S600/20 Aachen Germany /1991 5000 .

9 SNI Universitaet Karlsruhe Academic 1 4009 . 141 S600/20 Karlsruhe Germany /1990 5000 . 10 TMC GMD Research 64 3800 13056 149 CM-5/64 Birlinghoven Germany /1993 8192 6016 11 SNI Universitaet Darmstadt Academic 2 3624 10239 158 S400/40 Darmstadt Germany /1991 5000 . 12 SNI Universitaet Hannover Academic 2 3624 10239 159 S400/40 Hannover Germany /1991 5000 . 13 SGI EMBL Research 16 3624 14000 160 Power Challenge Heidelberg Germany /1994 4800 2000 14 SGI BMW AG Industry 14 3297 14000 171 Power Challenge Muenchen Germany /1994 Automotive 4200 2000 15 SGI FU Berlin Academic 14 3297 14000 172 Power Challenge Berlin Germany /1994 4200 2000 16 Cray Universitaet Stuttgart Research 4 3275 . 178 Y-MP C94/41024 Stuttgart Germany /1994 3810 . 17 Cray debis Industry 4 3275 . 179 Y-MP C94/4256 Stuttgart Germany /1994 Automotive 3810 . 18 Cray DKRZ Research 32 3200 14592 181 T3D MC32-2 Hamburg Germany /1994 Weather 4800 1616 19 Cray Universitaet Stuttgart Research 32 3200 14592 183 T3D MC32-2 Stuttgart Germany /1994 4800 1616 20 IBM DKFZ Research 14 2650 . 194 SP2/14 Heidelberg Germany /1994 3720 .

Top Supercomputers - Benelux

N Manufacturer Installation Site Field of # Rmax N_{max}

Benelux Computer Location/Year Application Proc. Rpeak N1/2 world [Mflop/s] 1 NEC National Aerospace Laboratory (NLR) Research 2 5000 3072 116 SX-3/22 Noordoostpolder Netherlands /1992 Aerospace 5500 384 2 SGI Technical University Academic 14 3297 14000 173 Power Challenge Eindhoven Netherlands /1994 4200 2000 3 Cray SARA (Stichting Academisch Rekencentrum) Academic 4 3275 .

177 Y-MP C98/4256 Amsterdam Netherlands /1994 3810 .

4 IBM Catholic University of Leuven Academic 16 3000 13500 184 SP2/16 Belgium /1994 4300 .

5 IBM ING Bank Industry 10 1950 . 284 SP2/10 Amsterdam Netherlands /1994 Finance 2660 .

6 SGI European Space Agency (ESTEC) Research 6 1467 14000 390 Power Challenge Noordwijk Netherlands /1994 1800 1000 7 SGI University of Twente Academic 6 1467 14000 404 Power Challenge Enschede Netherlands /1994 1800 1000 8 IBM European Space Agency (ESTEC) Research 16 1200 12000 459 9076-002 SP1 Noordwijk Netherlands /1993 2000 2300 9 IBM Shell KSLA Industry 16 1200 12000 462 9076-002 SP1 Netherlands /1994 Geophysics 2000 2300