0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 x 10^4 0

0.5

1

1.5

2

2.5

3

Matrix Size

Gflops

8x8, r=c=6

4x8, r=c=12

TRD performance on thin-node SP-2