DEC AlphaServer 4100

NEC SX-4

CRAY T-90

SGI PowerChallenge

SGI Power Challenge Array

Convex Exemplar Fujitsu VPP-300

Cray T3E

IBM SP-2

Addressing

Physical

Memory

Location

Shared Multiple

Distributed

Centralized

Palatino-Roman:Font not availableon this printer.